% Scribble should not change the default font from CMR
% to ptm for LNCS. See Guidelines for Authors of Papers
% to be Published in Springer Computer Science Proceedings,
% section 2.3, Fonts.
%
% IMPORTANT: the default package newtxmath *still*
% changes the math font. If you want to disable it,
% uncomment the next line
% \renewcommand\packageTxfonts\relax
% However, scribble would still generate LaTeX commands
% that depend on newtxmath upon rendering symbols
% \multimap, \multimapinv, \invamp and \square in
% scribble-lib/scribble/latex-render.rkt.
\renewcommand\renewrmdefault\relax
